adoption option

Maryland Equine Transition Service
Hank: a 2008, 15.5h QH gelding. Looking to add a most pleasant companion horse? He could happily provide a super opportunity for  children, to love him, groom & and take short pony rides around a field with him. or a non-riding therapy program. Willing, kind, straight forward & trustworthy.Not suited for daily riding due to Kissing Spine.
410-970-6474; horses@mdequinetransition.org;
www.mdequinetransition.org

Gentle Giants Draft Horse Rescue
Abigail: 18 year old Percheron cross mare.  15.3 hands and solid.  Abby is riding walk trot canter and enjoys work.
adoptions@gentlegiantsdrafthorserescue.org;
www.gentlegiantsdrafthorserescue.org

Lifeline Horse Rescue & Rehab., Inc.
Batilda:  big bay Standardbred ex-buggy horse. This 23-year-old sweetheart is looking for a forever companion home. Cooperative, gets along well with her equine and human friends, and loves treats.
301-318-1686; leila@lifelinehorserescue.org; www.lifelinehorserescue.org.

The Foxie G Foundation
Bobbyalexsgoldmark: 7 yr old, 16.2H gelding. Low level, occasional jumping & any kind of flat work. Loves having a job & is very brave.  Adoption fee $500.
301-667-2553; whinnywhiskers@thefoxiegfoundation.org;
www.thefoxiegfoundation.org

Middle Ridge Farm & Rescue
Prophet, 16 year old Registered Morgan gelding looking for a patient and experienced adopter who can provide a pasture home. Additional foster and adoptive homes needed for special equines, contact us today!
301-305-6440; info@middleridgefarm.com;
www.MiddleRidgeAnimalRescue.com

Southern Maryland Equine Miracles
Sugar Plum: 15yrs, 14 h,  Q pony type. Pretty, petite & friendly, loves attention, gets along w/ mares/geldings. If you are looking for an easy keeper, “companion only” horse, here is your girl!  Completed 90 days training. Experienced, gentle handler req. to continue her training.
somdequinemiracles@gmail.com;
www.southernmarylandequinemiracles.com

Days End Farm Horse Rescue
Nifty Nanook: 2013, 15.2hh, Warmblood. Handsome, easy-going gelding looking for a non-riding companion home. Curious, goofy personality. Nanook loves spending time with people & gets along well with both mares/geldings.
301-854-5037; Adopt@defhr.org; www.defhr.org

Gentle Giants Draft Horse Rescue
Toby: 3 year old Belgian gelding.  15 hands and growing.  Playful and mischievous, companion only due to old hip fracture.
adoptions@gentlegiantsdrafthorserescue.org;
www.gentlegiantsdrafthorserescue.org

GAIT, INC.
Kira: 13yo registered Paso Fino mare, stands around 14h. She is up to date on vaccines and farrier care, and is waiting for a kind adopter who loves riding adventures on the trail.  Adoption fee $1600 in Dillsburg, PA.
Visit www.gaitrrr.org for details

MidAtlantic Horse Rescue
Pleasant Outlook: dkb.g., 16.0+h, 2012; Tall dark handsome war horse. Adoption fee $1000. Other nice TBs available.
302-376-7297; Bev@MidAtlanticHorseRescue.org;
www.MidAtlanticHorseRescue.org

Contact Tracy at tracy@equiery.com to place your
Adoption Option for January

To be included in the Adoption Option, your rescue must be registered
with the Maryland Secretary of State Charitable Organizations Division

https://sos.maryland.gov/Charity/Pages/Instructions.aspx